en	Pages not found

en	Enrich your stats, display the pages requested by your visitors that could not be found.

en	The "pages not found" cache has been emptied.

en	The "pages not found" cache has been deleted.

en	Guide

en	404 errors

en	A 404 error is an HTTP error code which means that the file requested by the user cannot be found. In your case it means that one of your visitors entered a wrong URL in the address bar, or that you or another website has a dead link. When possible, the referrer is shown so you can find the page/site which contains the dead link. If not, it generally means that it is a direct access, so someone may have bookmarked a link which doesn't exist anymore.

en	How to catch these errors?

en	If your webhost supports .htaccess files, you can create one in the root directory of PrestaShop and insert the following line inside: "%s".

en	A user requesting a page which doesn't exist will be redirected to the following page: %s. This module logs access to this page.

en	You must use a .htaccess file to redirect 404 errors to the "404.php" page.

en	Page

en	Referrer

en	Counter

en	No "page not found" issue registered for now.

en	Empty database

en	Empty ALL "pages not found" notices for this period

en	Empty ALL "pages not found" notices